Graftyp: Tidsserie Valda Tidsserier: x1:GVX_Staketg_22, NO2, C01[M], Value 230101 00 - 231231 00

Gr�nsv�rde (st)

Staketgatan 22 (ug/m3)

230119 230216 230316 230413 230511 230608 230706 230803 230831 230928 231026 231123 231221 0

20

40

60

80

100

120

140

160

180

200

0

10

20

30

40

50

60

70

80

90

100

m=7 s=0 min=7 max=7 (at 230102) n=364 m=0 s=0 min=0 max=0 (at 230102) n=291