Graph type: Time Series 250424 14 - 250424 15

Stockholm, PM10, p00[M], Value (ug/m3)

14:00 14:10 14:20 14:30 14:40 14:50 15:00 0

20

40

60

80

100

120

140

160

200

m=1 s=0 min=1 max=1 (at 250424 15) n=2 c=100%